export default function SurveyLayout({
  children,
}: {
  children: React.ReactNode;
}) {
  return (
    <div className="relative flex min-h-screen items-center justify-center px-4 py-8">
      <div className="gradient-mesh pointer-events-none fixed inset-0 z-0" />
      <div className="relative z-10 w-full max-w-2xl">{children}</div>
    </div>
  );
}
